import {Chip} from "@nextui-org/react";

export default function App() {
  return (
    <div className="flex gap-4">
      <Chip size="sm">Small</Chip>
      <Chip size="md">Medium</Chip>
      <Chip size="lg">Large</Chip>
    </div>
  );
}
